/*
 Navicat Premium Data Transfer

 Source Server         : sqlser
 Source Server Type    : SQL Server
 Source Server Version : 13001601 (13.00.1601)
 Source Host           : 30036q420j.yicp.fun:11047
 Source Catalog        : LXZN_TEST_430
 Source Schema         : dbo

 Target Server Type    : SQL Server
 Target Server Version : 13001601 (13.00.1601)
 File Encoding         : 65001

 Date: 13/11/2023 13:48:04
*/


-- ----------------------------
-- Table structure for mom_eam_fault_info
-- ----------------------------
IF EXISTS (SELECT * FROM sys.all_objects WHERE object_id = OBJECT_ID(N'[dbo].[mom_eam_fault_info]') AND type IN ('U'))
	DROP TABLE [dbo].[mom_eam_fault_info]
GO

CREATE TABLE [dbo].[mom_eam_fault_info] (
  [id] nvarchar(32) COLLATE Chinese_PRC_CI_AS  NOT NULL,
  [num] nvarchar(32) COLLATE Chinese_PRC_CI_AS  NULL,
  [q_id] int  NULL,
  [cost] nvarchar(32) COLLATE Chinese_PRC_CI_AS  NULL,
  [is_certificate] nvarchar(32) COLLATE Chinese_PRC_CI_AS  NULL,
  [is_outage] nvarchar(32) COLLATE Chinese_PRC_CI_AS  NULL,
  [factor] text COLLATE Chinese_PRC_CI_AS  NULL,
  [modify_content] text COLLATE Chinese_PRC_CI_AS  NULL,
  [equipment_process] text COLLATE Chinese_PRC_CI_AS  NULL,
  [phenomenon] text COLLATE Chinese_PRC_CI_AS  NULL,
  [method1] text COLLATE Chinese_PRC_CI_AS  NULL,
  [method2] text COLLATE Chinese_PRC_CI_AS  NULL,
  [method3] text COLLATE Chinese_PRC_CI_AS  NULL,
  [result] text COLLATE Chinese_PRC_CI_AS  NULL,
  [start_check_time] datetime2(7)  NULL,
  [equipment_status] nvarchar(32) COLLATE Chinese_PRC_CI_AS  NULL,
  [anlysis] text COLLATE Chinese_PRC_CI_AS  NULL,
  [check_result] nvarchar(32) COLLATE Chinese_PRC_CI_AS  NULL,
  [active] text COLLATE Chinese_PRC_CI_AS  NULL,
  [suggest] text COLLATE Chinese_PRC_CI_AS  NULL,
  [judgment] text COLLATE Chinese_PRC_CI_AS  NULL,
  [different_judgment] text COLLATE Chinese_PRC_CI_AS  NULL,
  [update_method] nvarchar(32) COLLATE Chinese_PRC_CI_AS  NULL,
  [final_result] text COLLATE Chinese_PRC_CI_AS  NULL,
  [operater] nvarchar(32) COLLATE Chinese_PRC_CI_AS  NULL,
  [engineer] nvarchar(32) COLLATE Chinese_PRC_CI_AS  NULL,
  [mechanic] nvarchar(32) COLLATE Chinese_PRC_CI_AS  NULL,
  [work_leader] nvarchar(32) COLLATE Chinese_PRC_CI_AS  NULL,
  [center_leader] nvarchar(32) COLLATE Chinese_PRC_CI_AS  NULL,
  [team_leader] nvarchar(32) COLLATE Chinese_PRC_CI_AS  NULL,
  [repair_leader] nvarchar(32) COLLATE Chinese_PRC_CI_AS  NULL,
  [equip_leader] nvarchar(32) COLLATE Chinese_PRC_CI_AS  NULL,
  [guarantee_leader] nvarchar(32) COLLATE Chinese_PRC_CI_AS  NULL,
  [e_name] nvarchar(32) COLLATE Chinese_PRC_CI_AS  NULL,
  [e_model] nvarchar(32) COLLATE Chinese_PRC_CI_AS  NULL,
  [e_num] nvarchar(32) COLLATE Chinese_PRC_CI_AS  NULL
)
GO

ALTER TABLE [dbo].[mom_eam_fault_info] SET (LOCK_ESCALATION = TABLE)
GO

EXEC sp_addextendedproperty
'MS_Description', N'主键ID',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'id'
GO

EXEC sp_addextendedproperty
'MS_Description', N'编码',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'num'
GO

EXEC sp_addextendedproperty
'MS_Description', N'质量隐患确认单ID',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'q_id'
GO

EXEC sp_addextendedproperty
'MS_Description', N'维修费用',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'cost'
GO

EXEC sp_addextendedproperty
'MS_Description', N'操作员是否有操作证',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'is_certificate'
GO

EXEC sp_addextendedproperty
'MS_Description', N'是否断电重启',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'is_outage'
GO

EXEC sp_addextendedproperty
'MS_Description', N'加工过程中的变动因素',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'factor'
GO

EXEC sp_addextendedproperty
'MS_Description', N'具体更改内容',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'modify_content'
GO

EXEC sp_addextendedproperty
'MS_Description', N'发生事故时设备所执行的程序',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'equipment_process'
GO

EXEC sp_addextendedproperty
'MS_Description', N'发生事故时的现象',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'phenomenon'
GO

EXEC sp_addextendedproperty
'MS_Description', N'采取措施1',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'method1'
GO

EXEC sp_addextendedproperty
'MS_Description', N'采取措施2',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'method2'
GO

EXEC sp_addextendedproperty
'MS_Description', N'采取措施3',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'method3'
GO

EXEC sp_addextendedproperty
'MS_Description', N'事故所造成的结果',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'result'
GO

EXEC sp_addextendedproperty
'MS_Description', N'开始检查时间',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'start_check_time'
GO

EXEC sp_addextendedproperty
'MS_Description', N'发生事故后设备的状态',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'equipment_status'
GO

EXEC sp_addextendedproperty
'MS_Description', N'维修人员对事故的分析',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'anlysis'
GO

EXEC sp_addextendedproperty
'MS_Description', N'维修人员检查结果',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'check_result'
GO

EXEC sp_addextendedproperty
'MS_Description', N'事故原因分析过程中所采取的相关行为',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'active'
GO

EXEC sp_addextendedproperty
'MS_Description', N'建议采取的措施及时间节点',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'suggest'
GO

EXEC sp_addextendedproperty
'MS_Description', N'事故发生原因分析的核对',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'judgment'
GO

EXEC sp_addextendedproperty
'MS_Description', N'不同的意见及分析',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'different_judgment'
GO

EXEC sp_addextendedproperty
'MS_Description', N'整改措施',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'update_method'
GO

EXEC sp_addextendedproperty
'MS_Description', N'事故结论',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'final_result'
GO

EXEC sp_addextendedproperty
'MS_Description', N'操作者',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'operater'
GO

EXEC sp_addextendedproperty
'MS_Description', N'维修责任人',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'engineer'
GO

EXEC sp_addextendedproperty
'MS_Description', N'技术负责人',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'mechanic'
GO

EXEC sp_addextendedproperty
'MS_Description', N'工长',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'work_leader'
GO

EXEC sp_addextendedproperty
'MS_Description', N'中心主任',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'center_leader'
GO

EXEC sp_addextendedproperty
'MS_Description', N'组长',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'team_leader'
GO

EXEC sp_addextendedproperty
'MS_Description', N'维修站站长',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'repair_leader'
GO

EXEC sp_addextendedproperty
'MS_Description', N'管理室业务经理',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'equip_leader'
GO

EXEC sp_addextendedproperty
'MS_Description', N'运行保障部主管领导',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'guarantee_leader'
GO

EXEC sp_addextendedproperty
'MS_Description', N'设备名称',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'e_name'
GO

EXEC sp_addextendedproperty
'MS_Description', N'设备型号',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'e_model'
GO

EXEC sp_addextendedproperty
'MS_Description', N'设备编码',
'SCHEMA', N'dbo',
'TABLE', N'mom_eam_fault_info',
'COLUMN', N'e_num'
GO


-- ----------------------------
-- Primary Key structure for table mom_eam_fault_info
-- ----------------------------
ALTER TABLE [dbo].[mom_eam_fault_info] ADD CONSTRAINT [PK__mom_eam___3213E83FB193087F] PRIMARY KEY CLUSTERED ([id])
WITH (PAD_INDEX = OFF, STATISTICS_NORECOMPUTE = OFF, IGNORE_DUP_KEY = OFF, ALLOW_ROW_LOCKS = ON, ALLOW_PAGE_LOCKS = ON)  
ON [PRIMARY]
GO

