--技术状态鉴定相关菜单
INSERT INTO [dbo].[sys_permission] ([id], [parent_id], [name], [url], [component], [component_name], [redirect], [menu_type], [perms], [perms_type], [sort_no], [always_show], [icon], [is_route], [is_leaf], [keep_alive], [hidden], [hide_tab], [description], [create_by], [create_time], [update_by], [update_time], [del_flag], [rule_flag], [status], [internal_or_external]) VALUES (N'1942133491313348610', N'1939897134526668802', N'技术状态鉴定规范', N'/eam/base/technical/standard', N'eam/base/EamTechnicalStatusEvaluationStandardList', NULL, NULL, 1, NULL, N'1', 1, 0, NULL, 1, 1, 0, 0, 0, NULL, N'admin', '2025-07-07 16:08:02.0830000', NULL, NULL, 0, NULL, N'1', 0);
INSERT INTO [dbo].[sys_permission] ([id], [parent_id], [name], [url], [component], [component_name], [redirect], [menu_type], [perms], [perms_type], [sort_no], [always_show], [icon], [is_route], [is_leaf], [keep_alive], [hidden], [hide_tab], [description], [create_by], [create_time], [update_by], [update_time], [del_flag], [rule_flag], [status], [internal_or_external]) VALUES (N'1942928966207553537', N'1939877842439544833', N'技术状态鉴定', N'/eam/technical', N'layouts/RouteView', NULL, NULL, 1, NULL, N'1', 3, 0, NULL, 1, 0, 0, 0, 0, NULL, N'admin', '2025-07-09 20:48:58.0000000', N'admin', '2025-07-09 21:06:01.5150000', 0, NULL, N'1', 0);
INSERT INTO [dbo].[sys_permission] ([id], [parent_id], [name], [url], [component], [component_name], [redirect], [menu_type], [perms], [perms_type], [sort_no], [always_show], [icon], [is_route], [is_leaf], [keep_alive], [hidden], [hide_tab], [description], [create_by], [create_time], [update_by], [update_time], [del_flag], [rule_flag], [status], [internal_or_external]) VALUES (N'1942929298551619586', N'1942928966207553537', N'技术状态鉴定工单', N'/eam/technical/order', N'eam/technical/EamTechnicalStatusEvaluationOrderList', NULL, NULL, 1, NULL, N'1', 1, 0, NULL, 1, 1, 0, 0, 0, NULL, N'admin', '2025-07-09 20:50:17.3260000', NULL, NULL, 0, NULL, N'1', 0);
INSERT INTO [dbo].[sys_permission] ([id], [parent_id], [name], [url], [component], [component_name], [redirect], [menu_type], [perms], [perms_type], [sort_no], [always_show], [icon], [is_route], [is_leaf], [keep_alive], [hidden], [hide_tab], [description], [create_by], [create_time], [update_by], [update_time], [del_flag], [rule_flag], [status], [internal_or_external]) VALUES (N'1942929536536428545', N'1942928966207553537', N'技术状态工单变更', N'/eam/technical/order/change', N'eam/technical/EamTechnicalStatusEvaluationOrderChangeList', NULL, NULL, 1, NULL, N'1', 2, 0, NULL, 1, 1, 0, 0, 0, NULL, N'admin', '2025-07-09 20:51:14.0520000', NULL, NULL, 0, NULL, N'1', 0);
INSERT INTO [dbo].[sys_permission] ([id], [parent_id], [name], [url], [component], [component_name], [redirect], [menu_type], [perms], [perms_type], [sort_no], [always_show], [icon], [is_route], [is_leaf], [keep_alive], [hidden], [hide_tab], [description], [create_by], [create_time], [update_by], [update_time], [del_flag], [rule_flag], [status], [internal_or_external]) VALUES (N'1942929936559783938', N'1942928966207553537', N'技术状态变更申请', N'/eam/technical/status/change', N'eam/technical/EamTechnicalStatusChangeList', NULL, NULL, 1, NULL, N'1', 3, 0, NULL, 1, 1, 0, 0, 0, NULL, N'admin', '2025-07-09 20:52:49.4250000', NULL, NULL, 0, NULL, N'1', 0);
INSERT INTO [dbo].[sys_permission] ([id], [parent_id], [name], [url], [component], [component_name], [redirect], [menu_type], [perms], [perms_type], [sort_no], [always_show], [icon], [is_route], [is_leaf], [keep_alive], [hidden], [hide_tab], [description], [create_by], [create_time], [update_by], [update_time], [del_flag], [rule_flag], [status], [internal_or_external]) VALUES (N'1942930660488265730', N'1942928966207553537', N'技术状态鉴定申请', N'/eam/technical/evaluation/application', N'eam/technical/EamTechnicalStatusEvaluationApplicationList', NULL, NULL, 1, NULL, N'1', 4, 0, NULL, 1, 1, 0, 0, 0, NULL, N'admin', '2025-07-09 20:55:42.0220000', NULL, NULL, 0, NULL, N'1', 0);
INSERT INTO [dbo].[sys_permission] ([id], [parent_id], [name], [url], [component], [component_name], [redirect], [menu_type], [perms], [perms_type], [sort_no], [always_show], [icon], [is_route], [is_leaf], [keep_alive], [hidden], [hide_tab], [description], [create_by], [create_time], [update_by], [update_time], [del_flag], [rule_flag], [status], [internal_or_external]) VALUES (N'1942930964046823425', N'1942928966207553537', N'停用申请', N'/eam/technical/deactivate', N'eam/technical/EamTechnicalStatusDeactivateList', NULL, NULL, 1, NULL, N'1', 5, 0, NULL, 1, 1, 0, 0, 0, NULL, N'admin', '2025-07-09 20:56:54.3950000', NULL, NULL, 0, NULL, N'1', 0);
